-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40°

40°

50° 60° 70°

40° 40°

50°

50°

60°

60°

-10°

-30°

50°

60°

Average annual precipitation, 1940-1995 mm 1 - 300 300 - 500 500 - 800 800 - 1.000 1.000 - 1.600 1.600 - 4000 No data Outside data coverage