-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40° 50°

40°

40°

50°

50°

60°

60° No data Non EU-15

Exits from a gricultu ra l a re a from 1 99 0 -20 0 0 % 0.0 - 1.0 1.0 - 2.0 2.0 - 3.0 3.0 - 4.0 > 4.0