-20°

-10°

-10°

0°

0°

10°

10°

50°

50°

60°

60°

0 500 1,000 Kilom eters

Chloroph yll μg/ l

> 5.81

2.42 - 5.81

1.35 - 2.42

0 - 0.83 0.83 - 1.35