0°

0°

10°

10° 20°

20°

30°

30° 30°

40° 40°

0 500 1,000 Kilom eters

Chlorop hyll μg/ l 0 - 0.18 0.18 - 0.35 0.35 - 0.59 0.59 - 1.95 > 1.95