")

") ")

") ") ") ") ")

")

") ")

")

") ")

!(

!( !(!(

!(!( !(

!(

!( !( !( !(

!(

!(

!( !(

!( !(

!(

!(

!( !( !(

!(

!(

!(!( !(

-10°

-20°

-30°

0°

0°

10°

10°

20°

20° 30°

30°

40° 50°

40°

40°

50°

50°

60°

60°

-10°

-30°

40°

50°

Hg (mg/kg) Gadus (liver wet weight)

Clupea (muscle dry weight *0.25) ") ")

!(^{> 0.5}

0.05 - 0.5 > 0.5

!( 0 - 0.05

!( 0.05 - 0.5

") 0 - 0.05